         180           8
   8.75156818805276        8.71323716904943        8.52577869076767     
   8.41897043627557        8.24131412796250        8.09056755632970     
   8.04520852232105        7.93064636670707     
  -5.83184557410473       -5.71742166184910       -5.57800058939814     
  -5.43222145047764       -5.32873255258283       -5.33901787616167     
  -5.19968873389831       -4.81230324440093     
 -8.556433874137702E-003  0.000000000000000E+000
   1.00958891967813       0.000000000000000E+000
   1.01391433660489       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
