         180           8
   7.80671950105381        7.53623950881231        7.38596734053187     
   7.21440336589010        7.07487102891678        6.92071256086151     
   6.77824300090400        6.65120114356561     
  -5.59207485534042       -5.44571260407096       -5.23419388729708     
  -5.03386423297521       -4.90032699068404       -4.80789911683927     
  -4.62700151828604       -4.58018242986564     
 -8.805298067845970E-003  0.000000000000000E+000
   1.00956174345872       0.000000000000000E+000
   1.01405197292535       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
