         180           3
   7.62976356928906        9.23073188435084        11.0034846667966     
  -4.71806363263318       -4.13546952838405       -3.29170536122702     
  1.401461816820228E-003  0.000000000000000E+000
  0.986609813989164       0.000000000000000E+000
  0.983905597240881       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
