         180           8
   2.91761265710310        2.73985240674258        2.56044027165014     
   2.41313032441209        2.29934485063072        2.18804502502407     
   2.02739509626822        1.88780367669792     
  -4.10687940421494       -3.96053421953311       -3.74159477735674     
  -3.54995461551150       -3.35056460116655       -3.14137324973166     
  -2.97490321016546       -2.88052497865095     
 -8.978364846416124E-003  0.000000000000000E+000
   1.00912350724193       0.000000000000000E+000
   1.01373557844848       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
