         180           8
   5.50235710528561        5.39641775788297        5.22155285108847     
   5.08421985024911        4.95268504108645        4.83666721710381     
   4.75958959444261        4.78300033686782     
  -4.65019462850330       -4.51555551974022       -4.37690744384905     
  -4.24056167745760       -4.10903664650213       -3.99811790956508     
  -3.84592059335908       -3.65459080395831     
 -8.618079282171764E-003  0.000000000000000E+000
   1.00951710665218       0.000000000000000E+000
   1.01387501773178       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
