         180           8
   4.07482836928905        3.87639719919177        3.71384876074645     
   3.55902950696592        3.41956022402941        3.28672250335453     
   3.18003519109094        3.06252819979532     
  -4.51894571279527       -4.33012859360004       -4.17353794727484     
  -3.96147123038383       -3.78515649232627       -3.65692007937395     
  -3.51800650463546       -3.46955170735436     
 -8.807181417016053E-003  0.000000000000000E+000
   1.00929370310033       0.000000000000000E+000
   1.01388002394092       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
