         180           3
   7.61933750815732        8.73072264349182        10.0178370564766     
  -4.01268660420480      -0.908934140569362        2.72549138362468     
  1.504003451504092E-003  0.000000000000000E+000
  0.987013093014668       0.000000000000000E+000
  0.984364046794443       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
