         180           8
   6.31341867457143        5.57392667536010        4.93905109142310     
   4.32120827537745        3.73248796737900        3.15405585033118     
   2.62035846069128        2.22505338195100     
  -2.51214067336199       -3.07087400404409       -3.43239523021884     
  -3.60946857215144       -3.70381333030359       -3.78613587846321     
  -3.87012897125923       -3.98297742085743     
 -8.954504070833140E-003  0.000000000000000E+000
   1.00960870844009       0.000000000000000E+000
   1.01370401045338       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
