         180           8
   6.20839932694491        5.87312234515709        5.51138931834518     
   5.19915699792124        4.96083902497147        4.72516441732900     
   4.52247390348027        4.32790934617254     
  -5.00949605528689       -5.16435200388713       -5.28138406495203     
  -5.34271035844090       -5.43058309884872       -5.49373450475369     
  -5.45858092679750       -5.70584042092813     
 -8.550055779105678E-003  0.000000000000000E+000
   1.00955886568300       0.000000000000000E+000
   1.01408151159657       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
