         180           8
   6.02436420725395        5.43703341261695        4.84049126322643     
   4.26159130489299        3.63805243170115        3.07718911761807     
   2.59316445152164        2.11542887560118     
  -3.94471474244048       -3.96727729798182       -4.01346889001745     
  -4.02234046540035       -4.05748452292047       -4.14703691586791     
  -4.19611518921154       -4.16297584599729     
 -8.874229692416443E-003  0.000000000000000E+000
   1.00929433872692       0.000000000000000E+000
   1.01365268050901       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
