         180           8
   11.8735072286888        11.1924267512087        10.4810420771161     
   9.75382758543411        9.03638929032308        8.44380954012521     
   7.87974076732016        7.19410632400607     
  -5.21725789878263       -5.19421307454847       -5.14958532521151     
  -5.13562318001443       -5.30971264641710       -5.48903446645986     
  -5.57842574558240       -5.65122960291735     
 -8.734395892652260E-003  0.000000000000000E+000
   1.00918500759482       0.000000000000000E+000
   1.01297290154145       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
