         180           8
   5.92456715204744        5.70524880726753        5.54232133610675     
   5.33626219857043        5.20916572959555        5.06810369852141     
   5.00118820698659        4.95634715861997     
  -7.56972995280562       -7.43755593291721       -7.29005461743686     
  -7.11162624463696       -6.97891777579236       -6.87806737270787     
  -6.69704264691890       -6.49537513346453     
 -8.996723526694346E-003  0.000000000000000E+000
   1.00979737428352       0.000000000000000E+000
   1.01394502321765       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
