         180           8
   10.5710550681672        9.94277850490512        9.20879206929586     
   8.51646661313929        7.84115648342637        7.16038357159020     
   6.49285254219920        5.85394331809112     
  -7.08452391736377       -7.10311317282557       -7.08940223215901     
  -7.11327376550619       -7.12229689975158       -7.16934765023346     
  -7.20068702786539       -7.37480670797204     
 -9.138982620669098E-003  0.000000000000000E+000
   1.00998110065494       0.000000000000000E+000
   1.01401375273806       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
