         180           8
   5.61971605158664        5.39298899370796        5.21575218283937     
   5.03430313342182        4.89827468346292        4.79492585385275     
   4.72651526907665        4.72880640049869     
  -8.09768383796522       -8.06120839789450       -7.85231249235362     
  -7.64609538897779       -7.45853235511289       -7.21887482685645     
  -6.98072971684643       -6.72697419085819     
 -9.040642131486776E-003  0.000000000000000E+000
   1.00956484024641       0.000000000000000E+000
   1.01402719061975       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
