         180           8
   7.28544894194311        6.78677158564117        6.50212191687554     
   6.19806953262771        5.89899806237071        5.66237135926092     
   5.44854960062684        5.51633270449969     
  -7.23590388625026       -7.80402908392643       -8.23431363228509     
  -8.68159345543022       -9.14699104437716       -9.37740924478853     
  -9.46238850205736       -9.64111966703357     
 -9.036653119123749E-003  0.000000000000000E+000
   1.00959780779682       0.000000000000000E+000
   1.01336798467359       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
