         180           8
   10.8966172965970        10.2120980679195        9.50618465554241     
   8.79333417116128        8.03846962772467        7.32160972615520     
   6.61194121301864        5.89271429317571     
  -7.16260996923640       -7.11266376661299       -7.14551581777350     
  -7.19683467085672       -7.20368451207510       -7.19016344025879     
  -7.19220925752509       -7.20503061371412     
 -9.195459740322945E-003  0.000000000000000E+000
   1.00969716036833       0.000000000000000E+000
   1.01386507381254       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
