         180           8
   6.16027905818005        5.68535899100955        5.35880965815405     
   5.01252782180866        4.74114194657062        4.42443574858715     
   4.12113156737880        3.97804762437404     
  -8.40492698538805       -8.25339611223721       -8.17876944153413     
  -8.28361912591234       -8.39043453481712       -8.36983548252025     
  -8.39034632675536       -8.37325552826209     
 -8.914826452333631E-003  0.000000000000000E+000
   1.00961630982796       0.000000000000000E+000
   1.01379904554002       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
