         180           8
   5.53517216260545        5.28251704947566        5.11102808631657     
   4.96109049325707        4.84603498932573        4.72488045825489     
   4.65201899573172        4.69875818796441     
  -7.09780757731011       -7.01392914807795       -6.87726779903334     
  -6.71836580196737       -6.57828315535394       -6.46377014595522     
  -6.25463245788465       -6.03549827001711     
 -8.857761942515689E-003  0.000000000000000E+000
   1.00929772693334       0.000000000000000E+000
   1.01350918535628       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
