         180           8
   8.04281202492219        7.81812783359417        7.59570140235683     
   7.41518769522491        7.28514804895482        7.12060646878195     
   6.96219086738388        6.92660983934998     
  -7.66560925250770       -7.48127848292301       -7.29407036054046     
  -7.06959543949795       -6.85391408038370       -6.74613726516594     
  -6.66195507426271       -6.36588958678258     
 -8.799989779122476E-003  0.000000000000000E+000
   1.00932303868588       0.000000000000000E+000
   1.01378817720662       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
