         180           8
   6.70324448777129        6.49626024688010        6.27500104985695     
   6.09662256898709        5.93623620788935        5.73752212408349     
   5.57226721602045        5.53427585597466     
  -8.22879434264456       -7.99342072486268       -7.75727867762718     
  -7.51379835615236       -7.24335388814399       -7.02430268354121     
  -6.87041158834287       -6.71666065235242     
 -8.856233491895278E-003  0.000000000000000E+000
   1.00932005601197       0.000000000000000E+000
   1.01413567681963       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
