         180           8
   3.92436110345267        3.67438830565875        3.56723629746013     
   3.45004951465444        3.29095948807951        3.15375969235160     
   3.05448366070405        3.00487008180853     
  -6.47478634210106       -6.31364668476842       -6.09852589636032     
  -5.92777078505986       -5.76117965189970       -5.63689252244116     
  -5.60785626999015       -5.26638306459059     
 -8.876676858287540E-003  0.000000000000000E+000
   1.00956241737122       0.000000000000000E+000
   1.01377253792636       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
