         180           8
   6.87358466407604        6.55058648418095        6.32453744561990     
   6.04064139133517        5.92519589651645        5.73933834304549     
   5.52497429913665        5.53808637693925     
  -8.62686787657088       -7.87266891777633       -7.69621094122810     
  -7.54850269255884       -7.33033410672564       -7.19298094166637     
  -7.10659205494370       -6.76846509897530     
 -8.914431135162307E-003  0.000000000000000E+000
   1.00934688542517       0.000000000000000E+000
   1.01383832307806       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
