         180           3
   8.52670855601398        10.1759942811711        11.9021072357720     
  -6.76420959777375       -6.16811223319578       -5.28521180642686     
  1.104542798831220E-003  0.000000000000000E+000
  0.986806636319577       0.000000000000000E+000
  0.984060048477277       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
