         180           3
   8.10426043521815        9.64411533754295        11.2686346550144     
  -8.03695809331460       -7.21871531411024       -6.24001134012463     
  1.323523069149090E-003  0.000000000000000E+000
  0.986897696130718       0.000000000000000E+000
  0.984406590020809       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
