         180           8
   6.86454309296112        6.54541779924428        6.13261877578451     
   5.77520123695406        5.43549186485791        5.15614006343755     
   4.97259535167965        4.67284416373177     
  -7.56621553610675       -7.84494895720233       -8.03681157355984     
  -8.30518245941451       -8.55582068485833       -8.71755085859465     
  -8.77225604991986       -8.79725890645597     
 -8.873091156541436E-003  0.000000000000000E+000
   1.00970177267177       0.000000000000000E+000
   1.01366301595525       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
