         180           3
   8.46046686277070        9.94438095434874        11.4755160703558     
  -7.12674930511554       -6.49257810340809       -4.95614567294164     
  9.433573477502217E-004  0.000000000000000E+000
  0.986786708031425       0.000000000000000E+000
  0.984237618372090       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
