         180           8
   4.62665123356216        4.24786708060564        3.95571144530025     
   3.64040563754325        3.40369828716461        3.10908737584365     
   2.72638799325950        2.64491008467422     
  -7.95882764610497       -8.04037259634620       -8.07446581419976     
  -8.02064521678788       -7.92018269574435       -8.09505043542893     
  -8.48474351310390       -8.46887239648101     
 -8.906499027960235E-003  0.000000000000000E+000
   1.00913442290898       0.000000000000000E+000
   1.01309077560472       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
