         180           8
   5.01030842564966        4.71637215336338        4.40812919185048     
   4.09387050277284        3.82709440795562        3.57350633468246     
   3.29054059548206        3.14658713329855     
  -8.02129172240025       -8.13896642089459       -8.19256195096094     
  -8.16819221586519       -8.10972606627723       -8.35993330445016     
  -8.74112694148661       -8.76332569256793     
 -8.889954528579566E-003  0.000000000000000E+000
   1.00937972707390       0.000000000000000E+000
   1.01329951372941       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
