         180           3
   10.1123114803782        11.7846981180164        13.5682128216408     
  -8.19415573313486       -7.50049530482698       -6.51171083970868     
  9.156131499384211E-004  0.000000000000000E+000
  0.986348386676402       0.000000000000000E+000
  0.983559450353111       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
