         180           8
   6.63184380536687        6.30328862003195        6.13375812189263     
   5.96088799264386        5.70629189779687        5.50567204356832     
   5.39057720330084        5.15971669900156     
  -9.78060379600051       -8.87452525513288       -8.74622137275810     
  -8.51573195855652       -8.23398642512815       -7.94197818861831     
  -7.70623356998125       -7.46376416648210     
 -9.084365964433499E-003  0.000000000000000E+000
   1.00963023981769       0.000000000000000E+000
   1.01342541955528       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
