         180           3
   8.66191466296126        6.90023388488788        5.81027348486954     
  -8.18964863030919       -7.86982087831829       -7.41117962071204     
  1.024779307405886E-003  0.000000000000000E+000
  0.986922320489999       0.000000000000000E+000
  0.984225069941220       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
