         180           8
   5.68736151972584        5.33305112842238        5.00087768161430     
   4.70244937063692        4.49325860061914        4.30392083440380     
   4.12098540071088        3.95157643986908     
  -9.02312684924690       -9.17776468618064       -9.25248777347456     
  -9.24375889928848       -9.25315740864640       -9.23619781021709     
  -9.31347785222815       -10.2091819956114     
 -8.756656269765293E-003  0.000000000000000E+000
   1.00941500151265       0.000000000000000E+000
   1.01357804869006       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
