         180           8
   4.92520970848216        4.72893366196621        4.55355545506079     
   4.39093226970913        4.21072785082584        4.04027676604511     
   3.95806955247167        3.78890629489054     
  -8.64766739458579       -8.40629639197675       -8.25583580573350     
  -8.04320541613027       -7.80095299469826       -7.58514093379682     
  -7.37754474433950       -7.17482911108469     
 -8.711462997580154E-003  0.000000000000000E+000
   1.00907955469527       0.000000000000000E+000
   1.01300668338168       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
