         180           3
   8.92005677779911        10.5447895210062        12.2433301324453     
  -7.94978612467210       -7.22317179677002       -5.85792768520665     
  8.030630356307062E-004  0.000000000000000E+000
  0.986849122678525       0.000000000000000E+000
  0.984242014979102       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
