         180           8
   5.42217055591425        5.28967154896419        5.11396387564183     
   4.95871504999820        4.78521862429269        4.61066062554517     
   4.46690579311827        4.31106423827891     
  -8.33670131120228       -8.24276961204696       -8.05259396982651     
  -7.85461717138982       -7.61051491495226       -7.43583548284450     
  -7.32231727679725       -7.11857097687805     
 -8.996220435367306E-003  0.000000000000000E+000
   1.00908323450373       0.000000000000000E+000
   1.01325673533121       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
