         180           8
   5.27742889858022        5.02704421103125        4.86148529360587     
   4.69036436185523        4.54773121844342        4.41093585835402     
   4.30000805750266        4.16354699454732     
  -8.34593503009229       -8.21073693431683       -7.99931691906428     
  -7.76257091998278       -7.54274506878107       -7.33880150680274     
  -7.13154825993968       -6.90019417061303     
 -8.909400844898437E-003  0.000000000000000E+000
   1.00910541678532       0.000000000000000E+000
   1.01338252500155       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
