         180           8
   5.17555164321462        4.96713718981917        4.77325993570503     
   4.58135626373156        4.41855673856116        4.28079457750573     
   4.15588867549342        4.08228733971737     
  -8.13788007747628       -7.92390659092364       -7.71301906862003     
  -7.50327601350905       -7.29376716065125       -7.04987336164003     
  -6.83752855227284       -6.60059364239387     
 -8.916200689116204E-003  0.000000000000000E+000
   1.00936062712853       0.000000000000000E+000
   1.01383923811135       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
