         180           8
   5.16793861247420        5.07449554070841        4.90018910658318     
   4.72787941502317        4.54503519414033        4.39433086588957     
   4.26046086635218        4.19458731477212     
  -8.29377260711360       -8.11607159356281       -7.94869634163127     
  -7.75146308040617       -7.52191715180702       -7.29212318493502     
  -7.06155742281646       -6.84359320002373     
 -8.970442753352481E-003  0.000000000000000E+000
   1.00952980800534       0.000000000000000E+000
   1.01354765485013       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
