         180           8
   7.57463051110220        6.88093383018174        6.53266818604474     
   6.11330028015793        5.70393798635796        5.42084285068364     
   5.05288479046041        4.95691905839973     
  -7.81805676198958       -8.27183318349363       -8.36850371432671     
  -8.42548630347554       -8.58300084743653       -8.80746321435977     
  -9.29183718129146       -9.35444670246593     
 -8.527868757495220E-003  0.000000000000000E+000
   1.00919128840051       0.000000000000000E+000
   1.01349849329951       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
