         180           8
   10.7146197836527        10.5146030368092        10.3560803168716     
   10.1267027601205        9.80686703483511        9.63854881264262     
   9.60466104586528        9.29679725583710     
  -8.36001083199404       -8.12622900425706       -7.96120128261349     
  -7.74788239643946       -7.60456461123580       -7.52963293063308     
  -7.41918631308325       -7.36741426317368     
 -8.409134027808848E-003  0.000000000000000E+000
   1.00962395181728       0.000000000000000E+000
   1.01400361949841       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
