         180           8
   6.64612456941134        6.31968313319841        6.13232401797890     
   5.93296756876985        5.77538569820322        5.62698775788147     
   5.52787579379896        5.28690305920919     
  -7.90880099331422       -7.75948667148387       -7.59917016913255     
  -7.38434842143864       -7.13758579405333       -6.87554788063878     
  -6.63673374283377       -6.33573607757978     
 -8.592667413574987E-003  0.000000000000000E+000
   1.00951807453444       0.000000000000000E+000
   1.01407018121672       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
