         180           8
   6.80904727287680        6.56710320219117        6.40657056439899     
   6.23710272748980        6.10432182937111        5.95525217285437     
   5.81545759623628        5.61503695569820     
  -8.03944016551732       -7.95765583804647       -7.77539281358930     
  -7.57628667838234       -7.39818948504709       -7.21513754333757     
  -6.99920456187692       -6.86864367441337     
 -8.507329442948519E-003  0.000000000000000E+000
   1.00930377390111       0.000000000000000E+000
   1.01379286228007       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
