         180           8
   6.41736915867701        6.02549809592335        5.62485134141620     
   5.23397127801973        4.92807158016459        4.72607078525224     
   4.44850502013105        4.33226413540790     
  -7.80460639109754       -8.02693657118142       -8.27949615068868     
  -8.38281023773153       -8.50322155992862       -8.61507966708881     
  -8.52978321280037       -8.81151721457097     
 -8.398709575668645E-003  0.000000000000000E+000
   1.00943615320877       0.000000000000000E+000
   1.01415836679845       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
