         180           3
   10.0541289668369        11.5364623539724        13.3084435424108     
  -7.79295575942501       -7.06652481914516       -6.06030574994612     
  1.333945101670402E-003  0.000000000000000E+000
  0.986979253074284       0.000000000000000E+000
  0.984429665804858       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
