         180           8
   6.80284159503011        6.72052541320450        6.65444911172825     
   6.50635816616350        6.39001987211415        6.28891530723242     
   6.17130566896055        6.03807342061613     
  -7.89276714490431       -9.10750625447478       -9.40679412912172     
  -9.37932773818403       -9.28630341392497       -9.11669020162954     
  -8.94954920620094       -8.64644384148055     
 -9.178239995882945E-003  0.000000000000000E+000
   1.00947160900927       0.000000000000000E+000
   1.01340724835491       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
