         180           3
   10.2720607764510        11.5811814971436        13.0736744433948     
  -10.9544848955404       -10.3468719884594       -9.22604922568111     
  1.736911441664120E-003  0.000000000000000E+000
  0.987188921795681       0.000000000000000E+000
  0.984544978281446       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
