         180           8
   11.3130898008384        11.6485150438593        12.0214524224640     
   12.4249572821666        12.8216926311509        13.2250219934438     
   13.7557066263146        14.2076883056263     
  -11.5007630058533       -11.5925289429504       -11.5797485656412     
  -11.5829219363952       -11.5162037388886       -11.4253588853099     
  -11.2676256912341       -10.9018127460194     
  1.187548586754171E-003  0.000000000000000E+000
  0.987142368561489       0.000000000000000E+000
  0.984358891367074       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
