         180           8
   9.04464283956134        9.46778903126533        10.0250230652770     
   10.5241282713848        10.9871732754769        11.4409880233565     
   11.9533829982510        12.4592025538444     
  -10.2886536557634       -9.79581562111956       -10.2200651403712     
  -10.2671861910042       -10.0317589595561       -10.0227285305414     
  -10.0047457975892       -9.56683364365301     
  8.670268271655596E-004  0.000000000000000E+000
  0.987118144159811       0.000000000000000E+000
  0.984316061366015       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
