         180           8
   11.3003339185589        11.6642002490327        11.9969542664380     
   12.3827949168556        12.7676713297325        13.1118776874977     
   13.4983193608809        13.8898496918903     
  -13.2160362923230       -12.9392763171001       -12.8417567231967     
  -12.6751290888841       -12.4016214414128       -12.0775381573516     
  -11.7656448768340       -11.4501231551687     
  1.236987052030441E-003  0.000000000000000E+000
  0.987182692684204       0.000000000000000E+000
  0.984315446224413       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
