         180           8
   10.4890010928686        10.3559137632576        10.1656073196063     
   9.97516425962677        9.80790876285099        9.61471579359280     
   9.42341069082982        9.17041098476974     
  -13.1693108610952       -13.0326541874250       -12.8479854039518     
  -12.6599559745215       -12.4578607668318       -12.2586620089838     
  -12.0444048400179       -11.8132592967114     
 -9.314477685909152E-003  0.000000000000000E+000
   1.00940137743757       0.000000000000000E+000
   1.01349356926424       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
